3.5

3.0

2.5

2.0

1.5

1.0

MOPITT CO Column (x10^{18} ) [moelc.cm^{-2}]

3.5 3.0 2.5 2.0 1.5 1.0 FTS CO Column (x10^{18} ) [moelc.cm^{-2}]